== Déploiement sur CentOS

[source,bash]
----
yum update
groupadd --system webapps
groupadd --system gunicorn_sockets
useradd --system --gid webapps --shell /bin/bash --home /home/gwift gwift
mkdir -p /home/gwift
chown gwift:webapps /home/gwift
----

=== Installation des dépendances systèmes

[source,bash]
----
yum install python36 git tree -y
 
# CentOS 7 ne dispose que de la version 3.7 d'SQLite. On a besoin d'une version 3.8 au minimum:
wget https://kojipkgs.fedoraproject.org//packages/sqlite/3.8.11/1.fc21/x86_64/sqlite-devel-3.8.11-1.fc21.x86_64.rpm
wget https://kojipkgs.fedoraproject.org//packages/sqlite/3.8.11/1.fc21/x86_64/sqlite-3.8.11-1.fc21.x86_64.rpm
sudo yum install sqlite-3.8.11-1.fc21.x86_64.rpm sqlite-devel-3.8.11-1.fc21.x86_64.rpm -y
----

=== Préparation de l'environnement utilisateur

[source,bash]
----
su - gwift
cp /etc/skel/.bashrc .
cp /etc/skel/.bash_profile .
ssh-keygen
mkdir bin
mkdir .venvs
mkdir webapps
python3.6 -m venv .venvs/gwift
source .venvs/gwift/bin/activate
cd /home/gwift/webapps
git clone git@vmwmedtools:institutionnel/gwift.git
----

La clé SSH doit ensuite être renseignée au niveau du dépôt, afin de pouvoir y accéder. 

A ce stade, on devrait déjà avoir quelque chose de fonctionnel en démarrant les commandes suivantes:

[source,bash]
----
# en tant qu'utilisateur 'gwift'
 
source .venvs/gwift/bin/activate
pip install -U pip
pip install -r requirements/base.txt
pip install gunicorn
cd webapps/gwift
gunicorn config.wsgi:application --bind localhost:3000 --settings=config.settings_production
----

=== Configuration de l'application

[source,bash]
----
SECRET_KEY=<set your secret key here>
ALLOWED_HOSTS=*
STATIC_ROOT=/var/www/gwift/static
----

=== Création des répertoires de logs

[source,text]
----
mkdir -p /var/www/gwift/static
----

=== Création du répertoire pour le socket 

Dans le fichier `/etc/tmpfiles.d/gwift.conf`:

[source,text]
----
D /var/run/webapps 0775 gwift gunicorn_sockets -
----

Suivi de la création par systemd :

[source,text]
----
systemd-tmpfiles --create
----

=== Gunicorn

[source,bash]
----
#!/bin/bash
 
# defines settings for gunicorn
NAME="gwift"
DJANGODIR=/home/gwift/webapps/gwift
SOCKFILE=/var/run/webapps/gunicorn_gwift.sock
USER=gwift
GROUP=gunicorn_sockets
NUM_WORKERS=5
DJANGO_SETTINGS_MODULE=config.settings_production
DJANGO_WSGI_MODULE=config.wsgi
 
echo "Starting $NAME as `whoami`"
 
source /home/gwift/.venvs/gwift/bin/activate
cd $DJANGODIR
export DJANGO_SETTINGS_MODULE=$DJANGO_SETTINGS_MODULE
export PYTHONPATH=$DJANGODIR:$PYTHONPATH
 
exec gunicorn ${DJANGO_WSGI_MODULE}:application \
--name $NAME \
--workers $NUM_WORKERS \
--user $USER \
--bind=unix:$SOCKFILE \
--log-level=debug \
--log-file=-
----

=== Supervision

[source,bash]
----
yum install supervisor -y
----

On crée ensuite le fichier `/etc/supervisord.d/gwift.ini`:

[source,bash]
----
[program:gwift]
command=/home/gwift/bin/start_gunicorn.sh
user=gwift
stdout_logfile=/var/log/gwift/gwift.log
autostart=true
autorestart=unexpected
redirect_stdout=true
redirect_stderr=true
----

Et on crée les répertoires de logs, on démarre supervisord et on vérifie qu'il tourne correctement:

[source,bash]
----
mkdir /var/log/gwift
chown gwift:nagios /var/log/gwift

systemctl enable supervisord
systemctl start supervisord.service
systemctl status supervisord.service
● supervisord.service - Process Monitoring and Control Daemon
   Loaded: loaded (/usr/lib/systemd/system/supervisord.service; enabled; vendor preset: disabled)
   Active: active (running) since Tue 2019-12-24 10:08:09 CET; 10s ago
  Process: 2304 ExecStart=/usr/bin/supervisord -c /etc/supervisord.conf (code=exited, status=0/SUCCESS)
 Main PID: 2310 (supervisord)
   CGroup: /system.slice/supervisord.service
           ├─2310 /usr/bin/python /usr/bin/supervisord -c /etc/supervisord.conf
           ├─2313 /home/gwift/.venvs/gwift/bin/python3 /home/gwift/.venvs/gwift/bin/gunicorn config.wsgi:...
           ├─2317 /home/gwift/.venvs/gwift/bin/python3 /home/gwift/.venvs/gwift/bin/gunicorn config.wsgi:...
           ├─2318 /home/gwift/.venvs/gwift/bin/python3 /home/gwift/.venvs/gwift/bin/gunicorn config.wsgi:...
           ├─2321 /home/gwift/.venvs/gwift/bin/python3 /home/gwift/.venvs/gwift/bin/gunicorn config.wsgi:...
           ├─2322 /home/gwift/.venvs/gwift/bin/python3 /home/gwift/.venvs/gwift/bin/gunicorn config.wsgi:...
           └─2323 /home/gwift/.venvs/gwift/bin/python3 /home/gwift/.venvs/gwift/bin/gunicorn config.wsgi:...
ls /var/run/webapps/
----

On peut aussi vérifier que l'application est en train de tourner, à l'aide de la commande `supervisorctl`:

[source,bash]
----
$$$ supervisorctl status gwift
gwift                            RUNNING    pid 31983, uptime 0:01:00
----

Et pour gérer le démarrage ou l'arrêt, on peut passer par les commandes suivantes:

[source,bash]
----
$$$ supervisorctl stop gwift
gwift: stopped
root@ks3353535:/etc/supervisor/conf.d# supervisorctl start gwift
gwift: started
root@ks3353535:/etc/supervisor/conf.d# supervisorctl restart gwift
gwift: stopped
gwift: started
----


=== Ouverture des ports

[source,text]
----
firewall-cmd --permanent --zone=public --add-service=http
firewall-cmd --permanent --zone=public --add-service=https
firewall-cmd --reload
----

=== Installation d'Nginx

[source]
----
yum install nginx -y
usermod -a -G gunicorn_sockets nginx
----

On configure ensuite le fichier `/etc/nginx/conf.d/gwift.conf`:

----
upstream gwift_app {
        server unix:/var/run/webapps/gunicorn_gwift.sock fail_timeout=0;
}

server {
        listen 80;
        server_name <server_name>;
        root /var/www/gwift;
        error_log /var/log/nginx/gwift_error.log;
        access_log /var/log/nginx/gwift_access.log;
 
        client_max_body_size 4G;
        keepalive_timeout 5;
 
        gzip on;
        gzip_comp_level 7;
        gzip_proxied any;
        gzip_types gzip_types text/plain text/css text/xml text/javascript application/x-javascript application/xml;
 
 
        location /static/ {
                access_log off;
                expires 30d;
                add_header Pragma public;
                add_header Cache-Control "public";
                add_header Vary "Accept-Encoding";
                try_files $uri $uri/ =404;
        }
 
        location / {
                proxy_set_header X-Forwarded-For $proxy_add_x_forwarded_for;
                proxy_set_header Host $http_host;
                proxy_redirect off;
 
                proxy_pass http://gwift_app;
        }
}
----

=== Configuration des sauvegardes

Les sauvegardes ont été configurées avec borg: `yum install borgbackup`.

C'est l'utilisateur gwift qui s'en occupe.

----
mkdir -p /home/gwift/borg-backups/
cd /home/gwift/borg-backups/
borg init gwift.borg -e=none
borg create gwift.borg::{now} ~/bin ~/webapps
----

Et dans le fichier crontab :

----
0 23 * * * /home/gwift/bin/backup.sh
----

  
=== Rotation des jounaux
  
[source,bash]
----
/var/log/gwift/* {
        weekly        
        rotate 3      
        size 10M      
        compress      
        delaycompress 
}                     
----
  
  Puis on démarre logrotate avec # logrotate -d /etc/logrotate.d/gwift pour vérifier que cela fonctionne correctement. 